---
layout: docs
page_title: Set a global limit on traffic rates
description: Use global rate limits to prevent excessive rates of requests to Consul servers.
---

# Set a global limit on traffic rates

This topic describes how to configure rate limits for RPC and gRPC traffic to the Consul server.

## Introduction

Rate limits apply to each Consul server separately and limit the number of read requests or write requests to the server on the RPC and internal gRPC endpoints.

Because all requests coming to a Consul server eventually perform an RPC or an internal gRPC request, global rate limits apply to Consul's user interfaces, such as the HTTP API interface, the CLI, and the external gRPC endpoint for services in the service mesh.

Refer to [Initialize Rate Limit Settings](/consul/docs/agent/limits/init-rate-limits) for additional information about right-sizing your gRPC request configurations.

## Set a global rate limit for a Consul server

Configure the following settings in your Consul server configuration to limit the RPC and gRPC traffic rates.

- Set the rate limiter [`mode`](/consul/docs/agent/config/config-files#mode-1)
- Set the [`read_rate`](/consul/docs/agent/config/config-files#read_rate)
- Set the [`write_rate`](/consul/docs/agent/config/config-files#write_rate)

In the following example, the Consul server is configured to prevent more than `500` read and `200` write RPC calls:

<CodeTabs heading="Consul server agent">

```hcl
limits = {
    rate_limit = {
        mode = "enforcing"
        read_rate = 500
        write_rate = 200
    }
}
```

```json
{
    "limits" : {
        "rate_limit" : {
            "mode" : "enforcing",
            "read_rate" : 500,
            "write_rate" : 200
        }
    }
}

```

</CodeTabs>

## Monitor request rate traffic

You should continue to monitor request traffic to ensure that request rates remain within the threshold you defined. Refer to [Monitor traffic rate limit data](/consul/docs/agent/limits/usage/monitor-rate-limits) for instructions about checking metrics and log entries, as well as troubleshooting information.

## Disable request rate limits

Set the [`limits.request_limits.mode`](/consul/docs/agent/config/config-files#mode-1) to `disabled` to allow services to exceed the specified read and write requests limits, even limits specified in the [control plane request limits configuration entry](/consul/docs/connect/config-entries/control-plane-request-limit). Note that any other mode specified in the agent configuration only applies to global traffic rate limits.
