---
layout: commands
page_title: 'Commands: Troubleshoot Upstreams'
description: >-
  The `consul troubleshoot upstreams` lists the available upstreams in the Consul service mesh from the current service.
---

# Consul Troubleshoot Upstreams

Command: `consul troubleshoot upstreams`

The `troubleshoot upstreams` lists the available upstreams in the Consul service mesh from the current service.

## Usage

Usage: `consul troubleshoot upstreams [options]`

#### Command Options

- `-envoy-admin-endpoint=<value>` - Envoy admin endpoint address for the local Envoy instance.
Defaults to `127.0.0.1:19000`.

## Examples

Display all transparent proxy upstreams in Consul service mesh from the current Envoy instance.

  ```shell-session
  $ consul troubleshoot upstreams
  ==> Upstreams (explicit upstreams only) (0)

  ==> Upstreams IPs (transparent proxy only) (1)
  [10.4.6.160 240.0.0.3] true map[backend.default.dc1.internal.e08fa6d6-e91e-dfe0-f6e1-ba097a828e31.consul backend2.default.dc1.internal.e08fa6d6-e91e-dfe0-f6e1-ba097a828e31.consul]

  If you cannot find the upstream address or cluster for a transparent proxy upstream:
  - Check intentions: Tproxy upstreams are configured based on intentions. Make sure you have configured intentions to allow traffic to your upstream.
  - To check that the right cluster is being dialed, run a DNS lookup for the upstream you are dialing. For example, run `dig backend.svc.consul` to return the IP address for the `backend` service. If the address you get from that is missing from the upstream IPs, it means that your proxy may be misconfigured.
  ```
