---
layout: docs
page_title: Consul-Terraform-Sync CLI
sidebar_title: CLI
description: >-
  How to use the Consul-Terraform-Sync CLI
---

# Consul-Terraform-Sync Command (CLI)

Consul-Terraform-Sync is controlled via an easy to use command-line interface (CLI). Consul-Terraform-Sync is only a single command-line application: `consul-terraform-sync`.

Since there is no default configuration to run Consul-Terraform-Sync in a meaningful way, setting a configuration flag `-config-file` or `-config-dir` is required. For example:

```shell-session
$ consul-terraform-sync -config-file=config.hcl
```

To view a list of available flags, use the `-help` or `-h` flag.

## Modes

Consul-Terraform-Sync can be run in different modes.

### Daemon Mode

Flag: none

Behavior: This is the default mode in which Consul-Terraform-Sync passes through a once-mode phase and then turns into a long running process. During the once-mode phase, the daemon will exit with a non-zero status if it encounters an error. After successfully passing through once-mode phase, it will begin a long running process in which errors are logged and exiting is not expected behavior.

Usage: Intended to be run as a long running process after running once-mode successfully for given configuration and tasks.

### Inspect Mode

Flag: `-inspect`

Behavior: Consul-Terraform-Sync will display the proposed state changes for all tasks once and exit. No changes are applied in this mode. On encountering an error before completing, Consul-Terraform-Sync will exit with a non-zero status.

Usage: Intended to be run before daemon-mode in order to confirm configuration is accurate and tasks would update network infrastructure as expected.

---

Flag: `-inspect-task [task-name]`

Behavior: This has similar behavior as `-inspect` mode for the selected task. The flag can be specified multiple times to inspect multiple tasks. No changes are applied in this mode.

Usage: Useful to debug one or more tasks to confirm configuration is accurate and the selected tasks would update network infrastructure as expected.

### Once Mode

Flag: `-once`

Behavior: Consul-Terraform-Sync will run all tasks once with buffer periods disabled and exit. On encountering an error before completing, Consul-Terraform-Sync will exit with a non-zero status.

Usage: Intended to be run before daemon-mode in order to confirm configuration is accurate and tasks update network infrastructure as expected.
